==Command description==
This operation will convert a dump from one image format to another.

==Command usage==
<code>Aaru -d [true/false] -v [true/false] image convert -h [true/false] -c <count> --comments <comments> --creator <creator> --drive-manufacturer manufacturer> --drive-model <model> --drive-revision <revision> --drive-serial <serial> -f [true/false] --media-barcode <barcode> --media-lastsequence <number> --media-manufacturer <manufacturer> --media-model <model> --media-partnumber <partnumber> --media-sequence <sequence> --media-serial <serial> --media-title <title> -O <options> -p <format> -r <resume file> -x <xml sidecar> <input-path> <output-path></code>

<code>-d, --debug [true/false]</code> shows debug output from plugins ''(default false)''<br />
<code>-v, --verbose [true/false]</code> shows verbose output ''(default false)''<br />
<code>-h, --help [true/false]</code> shows help screen for the command instead of running it, ignores all other switches ''(default false)''<br />
<code>-c, --count <count></code> specifies how many sectors to convert at once ''(default 64)''<br />
<code>--comments <comments></code> specifies image comments<br />
<code>--creator <creator></code> specifies who (person) created the image?<br />
<code>--drive-manufacturer manufacturer></code> specifies manufacturer of the drive used to read the media represented by the image<br />
<code>--drive-model <model></code> specifies model of the drive used to read the media represented by the image<br />
<code>--drive-revision <revision></code> specifies firmware revision of the drive used to read the media represented by the image<br />
<code>--drive-serial serial></code> specifies serial number of the drive used to read the media represented by the image<br />
<code>-f, --force true/false]</code> continues conversion even if sector or media tags will be lost in the process ''(default false)''<br />
<code>--media-barcode <barcode></code> specifies barcode of the media represented by the image<br />
<code>--media-lastsequence <number></code> specifies last media of the sequence the media represented by the image corresponds to ''(default 0)''<br />
<code>--media-manufacturer manufacturer></code> specifies manufacturer of the media represented by the image<br />
<code>--media-model <model></code> specifies model of the media represented by the image<br />
<code>--media-partnumber <partnumber></code> specifies part number of the media represented by the image<br />
<code>--media-sequence <sequence></code> specifies number in sequence for the media represented by the image ''(default 0)''<br />
<code>--media-serial <serial></code> specifies serial number of the media represented by the image<br />
<code>--media-title <title></code> specifies title of the media represented by the image<br />
<code>-O, --options <options></code> specifies comma separated name=value pairs of options to pass to output image plugin<br />
<code>-p, --format <format></code> specifies format of the output image, as plugin name or plugin id. If not present, will try to detect it from output image extension<br />
<code>-r, --resume-file <resume file></code> takes list of dump hardware from existing resume file<br />
<code>-x, --cicm-xml <xml sidecar></code> takes metadata from existing CICM XML sidecar<br />

==Example==
<code>Aaru image convert -c 32 --comments "My converted image" --creator "Jane Doe" --drive-manufacturer "LG" --drive-model "CD-RW 1234" --drive-revision "1.0" --drive-serial "AABBCCDDEEFF01" --media-lastsequence 2 --media-sequence 1 --media-title "Important software" -O "deduplicate=true,nocompress=false" -r dd_dump.resume.xml -x dd_dump.cicm.xml dd_dump.iso dump.dicf</code>
