==Command description==
This operation tests the connection between Aaru and the specified Aaru Remote Server.

==Command usage==
<code>Aaru -d [true/false] -v [true/false] remote -h [true/false] <host></code> 

<code>-d, --debug [true/false]</code> shows debug output ''(default false)''<br />
<code>-v, --verbose [true/false]</code> shows verbose output ''(default false)''<br />
<code>-h, --help [true/false]</code> shows help screen for the command instead of running it, ignores all other switches ''(default false)''<br />

==Example==
<code>Aaru remote "IP address of host running Aaru Remote"</code>

==Operating system support==
{|
| FreeBSD
| Yes
|-
| macOS
| Yes
|-
| Linux
| Yes
|-
| Windows
| Yes
|}
