=== Data Position Measurement Block (`DPM*`)

This block captures measurements of each sector’s position, providing insights into the physical structure of the disc.
It is designed to facilitate analysis of disc geometry and sector layout.

The formal definition of this block’s format is reserved for a future revision of the specification.
